
h1. Testlink


h2. Test Internal links



h2. Test 'href' links



h2. Embeded href and links

The following list should not be detected as a TOC
* "Testlink":#Testlink
** "Test Internal links":#TestInternallinks
** "Test href links":#Testhreflinks
** "Embeded href and links":http://www.google.fr

But of course this one should

{toc}And this one also

{toc}
