---
Version: 7/155 16-CNL 113 512, Rev. K
Date: 2016-06-13

---
= EPTF CLL LGenBase, Function Description
:revnumber: 7/155 16-CNL 113 512, Rev. K
:revdate: 2016-06-13
:toc:

== Introduction

=== How to Read This Document

This is the Function Description for the LGenBase feature of the Ericsson Performance Test Framework (TitanSim), Core Library (CLL). EPTF CLL is developed for the TTCN-3 <<5-references.adoc#_1, [1]>> Toolset with TITAN <<5-references.adoc#_2, [2]>>.

=== Scope

This document is to specify the content and functionality of the LGenBase feature of the EPTF CLL. This feature is the basis for all load generators (LGens) components of TitanSim, that is, components whose main purpose is to generate messages.

=== Recommended Way of Reading

The readers are supposed to get familiar with the concept and functionalities of EPTF CLL <<5-references.adoc#_4, [4]>>. They should get familiar with the list of acronyms and the glossary in the Terminology section.

include::2-general_description.adoc[]
include::3-functional_interface.adoc[]
include::4-terminology.adoc[]
include::5-references.adoc[]